Thank you, Sarah, for your kind comment. My immune...

Thank you, Sarah, for your kind comment. My immune system is pretty robust at the moment! I reached that quarter way-marker in my new book today; only 45,000 words to go before revisions. I hope to finish the first draft by end of January.